A4 Portrait Poster / Leaflet
210mm x 297mm  Front

Bleed  (3mm)
The bleed is 3mm beyond the edge of your document.  If you do not want white borders on your finished document, colours and images must run into the bleed area. The bleed area will be trimmed during the finishing process. No text or important details should go into this area as they could be trimmed off.
Safe Area (5mm)
We recommend that your artwork is at least 5mm from the edge of the page and within the safe area, if you do not require the document to bleed.
Anything past the white dotted line will be trimmed off.

Creating a PDF of your document from InDesign
1.	From the File menu choose Export. Name your file and select Adobe PDF (print) in the format field. Now click Save button.
2.	In the Export Adobe PDF General dialog box, select High Quality Print as the Adobe PDF Preset and ensure that ‘Pages’ is selected (not ‘Spreads’).
3.	Next, Select Marks and Bleeds dialog box, tick Crop marks and type 3mm into the Bleed a a boxes at the bottom, it will auto fill the rest when you type 3mm into the Top box.
4.	Select Output and change the Profile Inclusion Policy to: Don’t include profiles.
5.	Now Click the Export button at the bottom right of the page.

0114 225 4763
theprintshop@shu.ac.uk
shu.ac.uk/theprintshop

A4 Portrait Poster / Leaflet
210mm x 297mm  Back