Bleed  (10mm)
The bleed is 3mm beyond the edge of your document.  If you do not want white borders on your finished document, colours and images must run into the bleed area. The bleed area will be trimmed during the finishing process. No text or important details should go into this area as they could be trimmed off.
Safe Area (10mm)
We recommend that your artwork is at least 5mm from the edge of the page and within the safe area, if you do not require the document to bleed.
Anything past the white dotted line will be trimmed off.